// @vitest-environment jsdom

import { describe, it } from "vitest";

describe("PullToRefresh", () => {
  it.todo("calls onRefresh after drag exceeds 64px threshold");
  it.todo("does not trigger when scrollTop is not 0");
  it.todo("resets pull distance on touch end below threshold");
});
